Key: Colour coded by wavelength; highest wavelength for multiples 0.300 to 0.513 Angstroms 0.513 to 0.725 Angstroms 0.725 to 0.938 Angstroms 0.938 to 1.150 Angstroms 1.150 to 1.363 Angstroms 1.362 to 1.575 Angstroms 1.575 to 1.788 Angstroms 1.788 to 2.000 Angstroms Singles and multiples; Spatial overlaps included

PF test from LAUEGEN