The software under consideration is The Daresbury Laboratory Laue Software Suite. The developers referred to below should be interpreted as the CCLRC Daresbury Laboratory.

Above conditions accepted for

by Name:

Position:

Signed:

Date:

CONDITIONS OF SOFTWARE DISTRIBUTION FOR ACADEMIC INSTITUTIONS

Daresbury Laboratory Laue Software Suite

The software is accepted for use at one site on the following conditions:

that there is no commitment by the developers to its correctness, its ease of installation, its ease of maintenance, the reliability of documentation (if any) and any future corrections or enhancements;

that it is the responsibility of users to ensure that the answers produced are scientifically valid;

that those who have received the software do not transfer it or make it available to other concerns and do not incorporate it in any form in a marketable product without the permission of the developers;

that, distribution of software being at times an expensive commitment, users requiring machine readable versions may be asked to pay for the time and media involved;

that there is no commitment by the developers to maintain the program suite or to answer questions on it.

(a)

(b) (c)

(d)

(e)

Institution & Postal Address: